From a0539d0c459b5d5733a64f00d3f1d596ae5e9c1c Mon Sep 17 00:00:00 2001
From: Rodolfo Carvalho <rhcarvalho@gmail.com>
Date: Tue, 9 May 2017 10:49:55 +0200
Subject: Remove vim configuration from Python files

In a project where contributors are free to use whatever editor they
want and we have linting tools that verify the proper formatting of
Python files, it should not be required to have a vim-specific line in
Python files.
---
 docs/best_practices_guide.adoc | 19 -------------------
 1 file changed, 19 deletions(-)

(limited to 'docs/best_practices_guide.adoc')

diff --git a/docs/best_practices_guide.adoc b/docs/best_practices_guide.adoc
index 4ecd535e4..e66c5addb 100644
--- a/docs/best_practices_guide.adoc
+++ b/docs/best_practices_guide.adoc
@@ -14,25 +14,6 @@ This guide complies with https://www.ietf.org/rfc/rfc2119.txt[RFC2119].
 
 == Python
 
-=== Python Source Files
-
-'''
-[[Python-source-files-MUST-contain-the-following-vim-mode-line]]
-[cols="2v,v"]
-|===
-| <<Python-source-files-MUST-contain-the-following-vim-mode-line, Rule>>
-| Python source files MUST contain the following vim mode line.
-|===
-
-[source]
-----
-# vim: expandtab:tabstop=4:shiftwidth=4
-----
-
-Since most developers contributing to this repository use vim, this rule helps to promote consistency.
-
-If mode lines for other editors are needed, please open a GitHub issue.
-
 === Method Signatures
 
 '''
-- 
cgit v1.2.3

